0 0.5 1 1.5 0

0.1

0.2

0.3

0.4 0 - 5%

EKRT+Viscous Hydrodynamics /s=0.2) η param0 ( /s(T)) η param1 (

=2.76 TeV NNs ALICE Pb+Pb

NSC(4,2)

0 0.5 1 1.5

0.5

1

1.5 20 - 30%

AMPT

default string melting string melting without hadronic rescattering

0 0.5 1 1.5 0

0.1

0.2

0.3

0.4 5 - 10% c < 5 GeV/ Tp < T,min p | < 0.8, η|

0 0.5 1 1.5

0.5

1

1.5 30 - 40%

0 0.5 1 1.5 0

0.1

0.2

0.3

0.4 10 - 20%

0 0.5 1 1.5

0.5

1

1.5 40 - 50%

0.5

1

1.5

0 0.1 0.2 0.3 0.4

0 0.5 1 1.5 0 0.5 1 1.5 0 0.5 1 1.5 ]c [GeV/

T,min p

NSC(4,2)